3000

2000

1000

9° 50’ 9° 40’ 9° 30’ 9° 20’ 9° 10’ 9° 00’ 8° 50’ 8° 40’ 8° 30’

40° 20’

40° 30’

40° 40’

40° 50’

41° 00’

41° 10’

41° 20’

41° 30’

1 2 3 45 678 9 10 14 15 16 18

M

long term mooring (station M)

ADCP transects internal wave stations

CTD stations

SAR image

T1

T3

Oporto