48^oW 45^oW 42^oW 39^oW 36^oW

58^oN

59^oN

60^oN

61^oN

62^oN

63^oN

64^oN

65^oN

OOI Irminger Sea Array

Surface Mooring

Profiler Mooring

Flanking Mooring

Flanking Mooring

-3500

-3000

-3000

-3000

-3000

-3000

-3000

-3000

-3000

-3000

-3000

-3000

-2500

-2500

-2500

-2500

-2500

-2500

-2500

-2000

-2000

-2000

-2000

-2000

-2000

-2000

-1500

-1500

-1500

-1500

-1500

-1500

-1000

-1000

-1000

-1000

-1000

-500

-500

-500

-500

-500

-500

-500

-500

-500

-500

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0

0