x440 / 2-700-2

52^oW 48^oW 44^oW 40^oW 36^oW 32^oW

36^oN

39^oN

42^oN

45^oN

48^oN

51^oN

⊗

0204

1104

1204

0205

0305

0505

0705

0805

0905

1005

1105

3.5 4 4.5 5 5.5 6 6.5 7 7.5 8 8.5 9